X-Git-Url: http://info.iut-bm.univ-fcomte.fr/pub/gitweb/simgrid.git/blobdiff_plain/1264d2c123d6828e4f628cfbf50447f3522ec5c4..62ab7fd2280a35af7c36f602852bc53fc0a56093:/examples/smpi/NAS/config/make.def

diff --git a/examples/smpi/NAS/config/make.def b/examples/smpi/NAS/config/make.def
deleted file mode 100644
index ad8f454a91..0000000000
--- a/examples/smpi/NAS/config/make.def
+++ /dev/null
@@ -1,73 +0,0 @@
-#---------------------------------------------------------------------------
-#
-#                SITE- AND/OR PLATFORM-SPECIFIC DEFINITIONS. 
-#
-#---------------------------------------------------------------------------
-
-#---------------------------------------------------------------------------
-# Items in this file will need to be changed for each platform.
-#---------------------------------------------------------------------------
-
-#---------------------------------------------------------------------------
-# Parallel C:
-#
-# MPICC      - C compiler 
-# CFLAGS     - C compilation arguments
-# CMPI_INC   - any -I arguments required for compiling MPI/C 
-# CLINK      - C linker
-# CLINKFLAGS - C linker flags
-# CMPI_LIB   - any -L and -l arguments required for linking MPI/C 
-#
-# compilations are done with $(MPICC) $(CMPI_INC) $(CFLAGS) or
-#                            $(MPICC) $(CFLAGS)
-# linking is done with       $(CLINK) $(CMPI_LIB) $(CLINKFLAGS)
-#---------------------------------------------------------------------------
-
-#---------------------------------------------------------------------------
-# This is the C compiler used for MPI programs
-#---------------------------------------------------------------------------
-MPICC = smpicc
-# This links MPI C programs; usually the same as ${MPICC}
-CLINK = $(MPICC)
-
-#---------------------------------------------------------------------------
-# These macros are passed to the linker to help link with MPI correctly
-#---------------------------------------------------------------------------
-CMPI_LIB  =
-
-#---------------------------------------------------------------------------
-# These macros are passed to the compiler to help find 'mpi.h'
-#---------------------------------------------------------------------------
-CMPI_INC =
-
-#---------------------------------------------------------------------------
-# Global *compile time* flags for C programs
-#---------------------------------------------------------------------------
-CFLAGS = -O2
-
-#---------------------------------------------------------------------------
-# Global *link time* flags. Flags for increasing maximum executable 
-# size usually go here. 
-#---------------------------------------------------------------------------
-CLINKFLAGS = -O2
-
-#---------------------------------------------------------------------------
-# Utilities C:
-#
-# This is the C compiler used to compile C utilities.  Flags required by 
-# this compiler go here also; typically there are few flags required; hence 
-# there are no separate macros provided for such flags.
-#---------------------------------------------------------------------------
-CC	= gcc -g
-
-#---------------------------------------------------------------------------
-# Destination of executables, relative to subdirs of the main directory. . 
-#---------------------------------------------------------------------------
-BINDIR	= ../bin
-
-#---------------------------------------------------------------------------
-# The variable RAND controls which random number generator 
-# is used. It is described in detail in README.install. 
-# Use "randi8" unless there is a reason to use another one. 
-#---------------------------------------------------------------------------
-RAND   = randi8
